;LIBRARY LIBPQ
EXPORTS
 PQconnectdb @ 1
 PQsetdbLogin @ 2
 PQconndefaults @ 3
 PQfinish @ 4
 PQreset @ 5
 PQrequestCancel @ 6
 PQdb @ 7
 PQuser @ 8
 PQpass @ 9
 PQhost @ 10
 PQport @ 11
 PQtty @ 12
 PQoptions @ 13
 PQstatus @ 14
 PQerrorMessage @ 15
 PQsocket @ 16
 PQbackendPID @ 17
 PQtrace @ 18
 PQuntrace @ 19
 PQsetNoticeProcessor @ 20
 PQexec @ 21
 PQnotifies @ 22
 PQsendQuery @ 23
 PQgetResult @ 24
 PQisBusy @ 25
 PQconsumeInput @ 26
 PQgetline @ 27
 PQputline @ 28
 PQgetlineAsync @ 29
 PQputnbytes @ 30
 PQendcopy @ 31
 PQfn @ 32
 PQresultStatus @ 33
 PQntuples @ 34
 PQnfields @ 35
 PQbinaryTuples @ 36
 PQfname @ 37
 PQfnumber @ 38
 PQftype @ 39
 PQfsize @ 40
 PQfmod @ 41
 PQcmdStatus @ 42
 PQoidStatus @ 43
 PQcmdTuples @ 44
 PQgetvalue @ 45
 PQgetlength @ 46
 PQgetisnull @ 47
 PQclear @ 48
 PQmakeEmptyPGresult @ 49
 PQprint @ 50
 PQdisplayTuples @ 51
 PQprintTuples @ 52
 lo_open @ 53
 lo_close @ 54
 lo_read @ 55
 lo_write @ 56
 lo_lseek @ 57
 lo_creat @ 58
 lo_tell @ 59
 lo_unlink @ 60
 lo_import @ 61
 lo_export @ 62
 pgresStatus @ 63
 PQmblen @ 64
 PQresultErrorMessage @ 65
 PQresStatus @ 66
 termPQExpBuffer @ 67
 appendPQExpBufferChar @ 68
 initPQExpBuffer @ 69
 resetPQExpBuffer @ 70
 PQoidValue @ 71
 PQclientEncoding @ 72
 PQenv2encoding @ 73
 appendBinaryPQExpBuffer @ 74
 appendPQExpBufferStr @ 75
 destroyPQExpBuffer @ 76
 createPQExpBuffer @ 77
 PQconninfoFree @ 78
 PQconnectPoll @ 79
 PQconnectStart @ 80
 PQflush @ 81
 PQisnonblocking @ 82
 PQresetPoll @ 83
 PQresetStart @ 84
 PQsetClientEncoding @ 85
 PQsetnonblocking @ 86
 PQfreeNotify @ 87
 PQescapeString @ 88
 PQescapeBytea @ 89
 printfPQExpBuffer @ 90
 appendPQExpBuffer @ 91
 pg_encoding_to_char @ 92
 pg_utf_mblen @ 93
 PQunescapeBytea @ 94
 PQfreemem @ 95
 PQtransactionStatus @ 96
 PQparameterStatus @ 97
 PQprotocolVersion @ 98
 PQsetErrorVerbosity @ 99
 PQsetNoticeReceiver @ 100
 PQexecParams @ 101
 PQsendQueryParams @ 102
 PQputCopyData @ 103
 PQputCopyEnd @ 104
 PQgetCopyData @ 105
 PQresultErrorField @ 106
 PQftable @ 107
 PQftablecol @ 108
 PQfformat @ 109
 PQexecPrepared @ 110
 PQsendQueryPrepared @ 111
 PQdsplen @ 112
 PQserverVersion @ 113
 PQgetssl @ 114
 pg_char_to_encoding @ 115
 pg_valid_server_encoding @ 116
 pqsignal @ 117
 PQprepare @ 118
 PQsendPrepare @ 119
 PQgetCancel @ 120
 PQfreeCancel @ 121
 PQcancel @ 122
 lo_create @ 123
 PQinitSSL @ 124
 PQregisterThreadLock @ 125
 PQescapeStringConn @ 126
 PQescapeByteaConn @ 127
 PQencryptPassword @ 128
 PQisthreadsafe @ 129
 enlargePQExpBuffer @ 130
 PQnparams @ 131
 PQparamtype @ 132
 PQdescribePrepared @ 133
 PQdescribePortal @ 134
 PQsendDescribePrepared @ 135
 PQsendDescribePortal @ 136
 lo_truncate @ 137
 PQconnectionUsedPassword @ 138
 pg_valid_server_encoding_id @ 139
 PQconnectionNeedsPassword @ 140
 lo_import_with_oid @ 141
 PQcopyResult @ 142
 PQsetResultAttrs @ 143
 PQsetvalue @ 144
 PQresultAlloc @ 145
 PQregisterEventProc @ 146
 PQinstanceData @ 147
 PQsetInstanceData @ 148
 PQresultInstanceData @ 149
 PQresultSetInstanceData @ 150
 PQfireResultCreateEvents @ 151
 PQconninfoParse @ 152
 PQinitOpenSSL @ 153
 PQescapeLiteral @ 154
 PQescapeIdentifier @ 155
 PQconnectdbParams @ 156
 PQconnectStartParams @ 157
 PQping @ 158
 PQpingParams @ 159
 PQlibVersion @ 160
 PQsetSingleRowMode @ 161
 lo_lseek64 @ 162
 lo_tell64 @ 163
 lo_truncate64 @ 164
 PQconninfo @ 165
 PQsslInUse @ 166
 PQsslStruct @ 167
 PQsslAttributeNames @ 168
 PQsslAttribute @ 169
 PQsetErrorContextVisibility @ 170
 PQresultVerboseErrorMessage @ 171
 PQencryptPasswordConn @ 172
 PQresultMemorySize @ 173
 PQhostaddr @ 174
 PQgssEncInUse @ 175
 PQgetgssctx @ 176
